WNEWMAIL ( 1L ) MISC. REFERENCE MANUAL PAGES WNEWMAIL ( 1L )

NAME wnewmail - daemon to asynchronously notify of new mail

SYNOPSISwnewmail wnewmail filename

DESCRIPTIONWnewmail is a daemon designed to run in a window on a windowing system (such as an HP or Sun system) and check every 10 seconds to see if there is any new mail for the user that started it up. If there is new mail, the program will "beep", and write to the window for each of the new messages;

Mail from <name> -- <subject> where <name> is either the name of the person sending it, if available (the ARPA ’From:’ line) or machine!login where machine is the machine the mail was sent from. If there is no subject, the message

"<no subject>" will appear on the screen. If the message is a priority message (that is, the header contains a line "Priority:"), then the line output will be "PRIORITY mail from ..." rather than just "Mail from". This program will run forever, and can internally reset itself if mail is deleted from the incoming mailbox while trying to monitor it. If wnewmail is started up with a filename, it will perform exactly the same, but with the specified file as the one to check rather than the default users mailbox.

AUTHORElm Development Group

SEE ALSOnotify in sh(1) or csh(1), newmail(1L)

NOTE This is almost identical to the program newmail...

BUG REPORTS TO

Syd Weinstein elm@DSI.COM (dsinc!elm)

COPYRIGHTS©Copyright 1988-1992 by The USENET Community Trust

Derived from Elm 2.0, © Copyright 1986, 1987 by Dave Taylor

USENET Community Trust Elm Version 2.4 1